Errata December 2, 1999

Behavioral and Structural Model Based Approaches to Discrete Diagnosis

Magnus Larsson Department of Electrical Engineering Linköping University, SE–581 83 Linköping, Sweden

Page 25 In Definition 3.15, the variable x should be replaced with u at four locations.

Page 44 The sentence after Definition 5.4 should be expanded to: From the condition R(z) = R^+(z) it is clear that there must be transitions going to and from each state in a symmetric relational model. If a relational model fulfills this, it can without loss of information be converted between asymmetric and symmetric (z = [x, v]):

Page 93 The expression for D(x, u) and the paragraph before should be changed to:

To check for immediate isolatability, we need only compare the faulty I/O behavior where the faults can be detected. Here, though, the I/O behavior must be different for all states. The states where the faults are detectable are:

D(x, u) = ¬(Ã_{fi,k} (x, u) ∧ Ã_{fj ,l} (x, u)) ∧ M̃_{io,N}(x, u).